/*
Navicat MySQL Data Transfer

Source Server         : localhost
Source Server Version : 50534
Source Host           : localhost:3306
Source Database       : aijinan

Target Server Type    : MYSQL
Target Server Version : 50534
File Encoding         : 65001

Date: 2019-01-19 14:52:16
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for live_scene
-- ----------------------------
DROP TABLE IF EXISTS `live_scene`;
CREATE TABLE `live_scene` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '数据ID',
  `title` varchar(255) DEFAULT NULL COMMENT '现场标题',
  `scene_type` smallint(6) DEFAULT NULL COMMENT '现场类型',
  `title_image` varchar(255) DEFAULT NULL COMMENT '标题图',
  `live_desc` varchar(255) DEFAULT NULL COMMENT '现场简介',
  `live_start` datetime DEFAULT NULL COMMENT '直播时间',
  `live_position` varchar(255) DEFAULT NULL COMMENT '直播地点',
  `live_state` smallint(6) DEFAULT NULL COMMENT '直播状态',
  `scene_mark` varchar(255) DEFAULT NULL COMMENT '现场备注',
  `scene_state` smallint(6) DEFAULT NULL COMMENT '现场状态',
  `direct_state` smallint(6) DEFAULT NULL COMMENT '导播状态',
  `process_id` int(11) DEFAULT NULL COMMENT '流程ID',
  `scene_sign` varchar(64) DEFAULT NULL COMMENT '现场唯一标识',
  `create_date` datetime DEFAULT NULL COMMENT '创建时间',
  `creator_id` int(11) DEFAULT NULL COMMENT '创建人',
  `update_date` datetime DEFAULT NULL COMMENT '修改时间',
  `updator_id` int(11) DEFAULT NULL COMMENT '修改人',
  `delete_flag` smallint(6) DEFAULT NULL COMMENT '是否删除',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='现场表';

-- ----------------------------
-- Table structure for live_scene_check
-- ----------------------------
DROP TABLE IF EXISTS `live_scene_check`;
CREATE TABLE `live_scene_check` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '数据ID',
  `scene_id` int(11) DEFAULT NULL COMMENT '现场ID',
  `process_id` int(11) DEFAULT NULL COMMENT '流程ID',
  `node_id` int(11) DEFAULT NULL COMMENT '节点ID',
  `auditor_id` int(11) DEFAULT NULL COMMENT '审核人ID',
  `auditor_name` varchar(64) DEFAULT NULL COMMENT '审核人姓名',
  `autitor_act` varchar(16) DEFAULT NULL COMMENT '审核动作标识',
  `check_info` varchar(255) DEFAULT NULL COMMENT '审核说明',
  `check_date` datetime DEFAULT NULL COMMENT '操作时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='现场审核表';

-- ----------------------------
-- Table structure for live_scene_live_info
-- ----------------------------
DROP TABLE IF EXISTS `live_scene_live_info`;
CREATE TABLE `live_scene_live_info` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '数据ID',
  `scene_id` int(11) DEFAULT NULL COMMENT '现场ID',
  `user_id` int(11) DEFAULT NULL COMMENT '人员ID',
  `push_url` varchar(255) DEFAULT NULL COMMENT '推流地址',
  `push_state` smallint(6) DEFAULT NULL COMMENT '推流状态',
  `push_start` datetime DEFAULT NULL COMMENT '推流开始时间',
  `push_end` datetime DEFAULT NULL COMMENT '推流结束时间',
  `play_url_rmtp` varchar(255) DEFAULT NULL COMMENT 'RMTP播流地址',
  `play_url_hls` varchar(255) DEFAULT NULL COMMENT 'HLS播流地址',
  `play_url_flv` varchar(255) DEFAULT NULL COMMENT 'FLV播流地址',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='现场直播信息表';
