CREATE TABLE `sys_tenant` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `parent_id` bigint(20) DEFAULT NULL COMMENT '父id',
  `tenant_name` varchar(50) DEFAULT NULL COMMENT '机构名',
  `category` tinyint(2) DEFAULT '1' COMMENT '1，机构；2，个人',
  `license` varchar(100) DEFAULT NULL COMMENT '营业执照',
  `license_url` varchar(1000) DEFAULT NULL COMMENT '营业执照url',
  `status` tinyint(4) DEFAULT NULL COMMENT '状态  0：禁用   1：正常',
  `sort` int(11) DEFAULT '0' COMMENT '排序',
  `remark` varchar(10000) DEFAULT NULL COMMENT '备注',
  `create_time` datetime DEFAULT NULL,
  `create_user_id` bigint(20) DEFAULT NULL COMMENT '创建者ID',
  `delete_flag` tinyint(1) DEFAULT '0',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4;