
DROP TABLE IF EXISTS `live_scene_live_info_record`;
CREATE TABLE `live_scene_live_info_record` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `info_id` int(11) DEFAULT NULL COMMENT '流id',
  `info_name` varchar(128) DEFAULT NULL COMMENT '冗余字段，流名',
  `domain` varchar(64) DEFAULT NULL COMMENT '域名',
  `app_name` varchar(64) DEFAULT NULL,
  `stream_name` varchar(255) DEFAULT NULL,
  `uri` varchar(128) DEFAULT NULL COMMENT '视频时长',
  `duration` double DEFAULT NULL COMMENT '视频时长',
  `start_time` int(11) DEFAULT NULL COMMENT '开始unix时间',
  `stop_time` int(11) DEFAULT NULL COMMENT '结束unix时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8mb4 COMMENT='流录制记录';


DROP TABLE IF EXISTS `live_scene_record`;
CREATE TABLE `live_scene_record` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `scene_id` int(11) DEFAULT NULL COMMENT '现场id',
  `record_name` varchar(128) DEFAULT NULL COMMENT '回顾名称',
  `uri` varchar(128) DEFAULT NULL COMMENT '视频时长',
  `duration` double DEFAULT NULL COMMENT '视频时长',
  `start_time` int(11) DEFAULT NULL COMMENT '开始unix时间',
  `stop_time` int(11) DEFAULT NULL COMMENT '结束unix时间',
  `creator_id` int(11) DEFAULT NULL,
  `create_date` datetime DEFAULT NULL,
  `last_updator_id` int(11) DEFAULT NULL,
  `last_update_date` datetime DEFAULT NULL,
  `record_status` int(11) DEFAULT NULL COMMENT '0:未审核；1：审核显示',
  `is_delete` int(11) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8mb4 COMMENT='现场回顾';


DROP TABLE IF EXISTS `live_stream_black`;
CREATE TABLE `live_stream_black` (
  `domain` varchar(64) DEFAULT NULL COMMENT '域名',
  `app_name` varchar(64) DEFAULT NULL,
  `stream_name` varchar(64) DEFAULT NULL,
  `time` int(11) DEFAULT NULL COMMENT 'unix 时间戳'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='黑名单流';


DROP TABLE IF EXISTS `live_stream_status`;
CREATE TABLE `live_stream_status` (
  `time` int(11) DEFAULT NULL COMMENT 'unix 时间戳',
  `action` varchar(15) DEFAULT NULL COMMENT 'publish 表示推流，publish_done 表示断流',
  `app` varchar(64) DEFAULT NULL COMMENT '默认为自定义的推流域名，如果未绑定推流域名即为播放域名',
  `app_name` varchar(64) DEFAULT NULL COMMENT '应用名称',
  `stream_name` varchar(64) DEFAULT NULL COMMENT '流名称',
  `node` varchar(64) DEFAULT NULL COMMENT 'CDN 接受流的节点或者机器名',
  `IP` varchar(20) DEFAULT NULL COMMENT '推流的客户端 IP',
  `usrargs` text COMMENT '用户推流的参数'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='流状态变更';

