DROP TABLE IF EXISTS `live_scene_count`;
CREATE TABLE `live_scene_count` (
  	`scene_id` int(11) NOT NULL,
  	`views` int(11) NOT NULL DEFAULT '0' COMMENT '总访问数',
	`views_show` int(11) NOT NULL DEFAULT '0' COMMENT '前端显示访问数',
  	`views_month` int(11) NOT NULL DEFAULT '0' COMMENT '月访问数',
  	`views_week` int(11) NOT NULL DEFAULT '0' COMMENT '周访问数',
  	`views_day` int(11) NOT NULL DEFAULT '0' COMMENT '日访问数',
	`comments` int(11) NOT NULL DEFAULT '0' COMMENT '总评论数',
  	`comments_show` int(11) NOT NULL DEFAULT '0' COMMENT '前端显示评论数',
  	`comments_month` int(11) NOT NULL DEFAULT '0' COMMENT '月评论数',
  	`comments_week` smallint(6) NOT NULL DEFAULT '0' COMMENT '周评论数',
  	`comments_day` smallint(6) NOT NULL DEFAULT '0' COMMENT '日评论数',
	`last_update_time` datetime DEFAULT NULL COMMENT '最后更新时间',
 	PRIMARY KEY (`scene_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='现场直播计数表';