/*
Navicat MySQL Data Transfer

Source Server         : localhost_3306
Source Server Version : 50709
Source Host           : localhost:3306
Source Database       : aijinan

Target Server Type    : MYSQL
Target Server Version : 50709
File Encoding         : 65001

Date: 2019-01-29 15:21:34
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for `live_video_transcoding_message`
-- ----------------------------
DROP TABLE IF EXISTS `live_video_transcoding_message`;
CREATE TABLE `live_video_transcoding_message` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `authorization` varchar(255) DEFAULT NULL COMMENT '此次推送请求的签名',
  `request_id` varchar(255) DEFAULT NULL COMMENT '此次推送消息的 Request 编号',
  `signing_cert_url` varchar(255) DEFAULT NULL COMMENT '签名证书的地址（Base64编码过）',
  `message_id` varchar(255) DEFAULT NULL COMMENT '此次推送消息的 MessageId',
  `message_tag` varchar(255) DEFAULT NULL COMMENT '此次推送消息的消息标签',
  `job_id` varchar(255) DEFAULT NULL COMMENT '任务id',
  `trans_request_id` varchar(255) DEFAULT NULL COMMENT '转码请求的requestId',
  `type` varchar(64) DEFAULT NULL COMMENT '类型',
  `state` varchar(64) DEFAULT NULL COMMENT '状态',
  `create_date` datetime DEFAULT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4;

-- ----------------------------
-- Records of live_video_transcoding_message
-- ----------------------------
